;-------------------------------------------------------------------------------
;------ disable params ---------------------------------------------------------

[disable]
linear_factor		= 1.0
angular_factor		= 1.0

;-------------------------------------------------------------------------------
;------ particle bones ---------------------------------------------------------

[particle_bones]
bip01_head 			= 0,0,0
bip01_spine1 		= 0,0,0
bip01_l_upperarm 	= 0,0,0
bip01_r_upperarm 	= 0,0,0
bip01_l_thigh 		= 0,0,0
bip01_r_thigh 		= 0,0,0

;-------------------------------------------------------------------------------
;------ foot bones -------------------------------------------------------------

[foot_bones]
front_left 			= bip01_l_toe0
front_right 		= bip01_r_toe0

;-------------------------------------------------------------------------------
;------ capture params ---------------------------------------------------------

[capture]
bone				= bip01_head			; bone for capture
distance			= 0.3					; distance - less this distance between bone and capture taget object is captured
time_limit       	= 3			        	; max time for trying to capture object "sec"
pull_force       	= 8000					; max force used to bring the taget to capture bone
pull_distance   	= 1.4					; max distance taget can be puled
velocity_scale   	= 0.022					; velocity scale for pulling 1- normal
capture_force    	= 6500					; max force for holding taget

[capture_used_bones]
bones = bip01_r_calf, bip01_l_calf, bip01_r_forearm, bip01_l_forearm

;-------------------------------------------------------------------------------
;------ End params -------------------------------------------------------------