[volume]
	EmittersNum			= 3
	Hemi				= 0.2
	ConfinementScale	= 0.08
	Decay 				= 0.990
	;Type				= Fire
	GravityBuoyancy		= 0.0045;

[emitter00]
	Type 			= SimpleGaussian
	Position 		= 50.0, 40.0, 03.0
;	Radius			= 0.15
	Radius			= 0.10
	Sigma			= 1
	FlowSpeed		= 0.45

	FlowDirection	= -0.3, 1.0, 0.8
	Density			= 0.3

	ApplyDensity	= 1
	ApplyImpulse	= 1

[emitter01]
	Type 			= SimpleGaussian
	Position 		= 30.0, 40.0, 03.0
;	Radius			= 0.15
	Radius			= 0.10
	Sigma			= 1
	FlowSpeed		= 0.45

	FlowDirection	= -0.3, 1.0, 0.8
	Density			= 0.3

	ApplyDensity	= 1
	ApplyImpulse	= 1

[emitter02]
	Type 			= SimpleGaussian
	Position 		= 60.0, 40.0, 03.0
;	Radius			= 0.15
	Radius			= 0.10
	Sigma			= 1
	FlowSpeed		= 0.45

	FlowDirection	= -0.3, 1.0, 0.8
	Density			= 0.3

	ApplyDensity	= 1
	ApplyImpulse	= 1


[emitter21]
	Type 			= SimpleGaussian
	Position 		= 50.0, 40.0, 65.0
;	Radius			= 0.15
	Radius			= 0.10
	Sigma			= 1
	FlowSpeed		= 0.15

	FlowDirection	= -0.3, 1.0, -0.8
	Density			= 0.4

	ApplyDensity	= 1
	ApplyImpulse	= 1

[emitter11]
	Type 			= SimpleGaussian
	Position 		= 49.0, 10.0, 54.0
	Radius			= 0.25
	Sigma			= 1
	FlowSpeed		= 0.4
	FlowDirection	= -0.7, 1.5, -0.8
	Density			= 2.0

	ApplyDensity	= 1
	ApplyImpulse	= 1

[emitter12]
	Type 			= SimpleGaussian
	Position 		= 35.0, 10.0, 40.0
;	Radius			= 0.15
	Radius			= 0.22
	Sigma			= 1
	FlowSpeed		= 0.1
	FlowDirection	= -1.2, 1.5, -0.8
	Density			= 1.0

	ApplyDensity	= 1
	ApplyImpulse	= 1