;-------------------------------------------------------------------------------
;------ disable params ---------------------------------------------------------

[disable]
linear_factor		= 1.0
angular_factor		= 1.0

;-------------------------------------------------------------------------------
;------ particle bones ---------------------------------------------------------

[particle_bones]
head				= 0,0,0
chest				= 0,0,0
spine		 		= 0,0,0

;-------------------------------------------------------------------------------
;------ foot bones -------------------------------------------------------------

[foot_bones]
front_left 			= left_foot
front_right 		= right_foot

;-------------------------------------------------------------------------------
;------ capture params ---------------------------------------------------------

[capture]
bone				= head			; bone for capture
distance			= 0.05			; distance - less this distance between bone and capture taget object is captured
time_limit       	= 5			   	; max time for trying to capture object "sec"
pull_force       	= 12000000		; max force used to bring the taget to capture bone
pull_distance   	= 1.4			; max distance taget can be puled
velocity_scale   	= 1				; velocity scale for pulling 1- normal
capture_force    	= 65000000		; max force for holding taget

[capture_used_bones]
bones = left_arm, right_arm, left_forearm, right_forearm

;-------------------------------------------------------------------------------
;------ End params -------------------------------------------------------------