\;-------------------------------------------------------------------------------
;------ disable params ---------------------------------------------------------

[disable]
linear_factor   = 1.0
angular_factor    = 1.0

;-------------------------------------------------------------------------------
;------ particle bones ---------------------------------------------------------

[particle_bones]
bip01_head        = 0,0,0
bip01_spine       = 0,0,0
bip01_r_thigh     = 0,0,0
bip01_l_thigh     = 0,0,0
bip01_l_upperarm  = 0,0,0
bip01_r_upperarm  = 0,0,0

;-------------------------------------------------------------------------------
;------ foot bones -------------------------------------------------------------

[foot_bones]
front_left        = bip01_l_toe1
front_right       = bip01_r_toe1

;-------------------------------------------------------------------------------
;------ capture params ---------------------------------------------------------

[capture]
bone        = bip01_r_finger2         ; bone for capture
distance      = 0.05        ; distance - less this distance between bone and capture taget object is captured
time_limit        = 5               ; max time for trying to capture object "sec"
pull_force        = 12000000          ; max force used to bring the taget to capture bone
pull_distance     = 5        ; max distance taget can be puled
velocity_scale    = 1         ; velocity scale for pulling 1- normal
capture_force     = 65000000          ; max force for holding taget

[capture_used_bones]
bones = bip01_r_calf, bip01_l_calf, bip01_r_forearm, bip01_l_forearm

;-------------------------------------------------------------------------------
;------ End params -------------------------------------------------------------