[volume]
	EmittersNum		= 2
	Hemi			= 0.0

	GravityBuoyancy		= 0.0015;

[emitter01]
	Type 			= SimpleGaussian
	Position 		= 49.0, 10.0, 54.0
	Radius			= 0.25
	Sigma			= 1
	FlowSpeed		= 0.4
	FlowDirection	= -0.7, 1.5, -0.8
	Density			= 2.0

	ApplyDensity	= 1
	ApplyImpulse	= 1

[emitter00]
	Type 			= SimpleGaussian
	Position 		= 35.0, 10.0, 40.0
;	Radius			= 0.15
	Radius			= 0.22
	Sigma			= 1
	FlowSpeed		= 0.1
	FlowDirection	= -1.2, 1.5, -0.8
	Density			= 1.0

	ApplyDensity	= 1
	ApplyImpulse	= 1