[sect_hospital]
00:00:00	   		=	hospital_01
12:00:00	   		=	hospital_02

01:00:00		=	hospital_01
02:00:00		=	hospital_01
03:00:00		=	hospital_01
04:00:00		=	hospital_01
05:00:00		=	hospital_01
06:00:00		=	hospital_01
07:00:00		=	hospital_01
08:00:00		=	hospital_01
09:00:00		=	hospital_01
10:00:00		=	hospital_01
11:00:00		=	hospital_01
12:00:00		=	hospital_01
13:00:00		=	hospital_01
14:00:00		=	hospital_01
15:00:00		=	hospital_01
16:00:00		=	hospital_01
17:00:00		=	hospital_01
18:00:00		=	hospital_01
19:00:00		=	hospital_01
20:00:00		=	hospital_01
21:00:00		=	hospital_01
22:00:00		=	hospital_01
23:00:00		=	hospital_01
00:00:00		=	hospital_01

[hospital_01]
flares			=  	flares_sun_rise
sky_texture		=	sky\sky_2_cube
sky_rotation	=	0
sky_color		=	1.0,    1.0,  	1.0
clouds_texture	=	sky\sky_oblaka
clouds_color	=	0.698, 0.447, 0.322, 0.4, 1.7
far_plane		=	350
fog_distance	=	350
fog_color		=	0.322, 0.302, 0.353
fog_density		=	0.9
rain_density	=	0.0
rain_color		=	1.0,	1.0,	1.0
thunderbolt		=
bolt_period		=	3.f
bolt_duration	=	0.25f
wind_velocity	=	0.0
wind_direction	=	0.0
;ambient			=	0.0425,	0.045,	0.0475
ambient			=	0.07,	0.07,	0.07
lmap_color		=	1.0,    1.0,  	1.0
;hemi_color		=   0.90, 0.925, 0.950, 1
hemi_color		=   0.80, 0.80, 0.80, 1
sun_color		=	0.829, 0.408, 0.306
sun_dir			=	-45.0, 291
env_ambient		=	ambient_env_hospital

[hospital_01_old]
flares			=	flares_sun_rise
sky_texture		=	sky\sky_18_cube
sky_rotation	=	0
sky_color		=	1.0,    1.0,  	1.0
clouds_texture	=	sky\sky_oblaka
clouds_color	=	1.0, 1.0, 1.0, 0.5, 1.7
far_plane		=	350
fog_distance	=	350
fog_color		=	0.427, 0.412, 0.431
fog_density		=	0.9
rain_density	=	0.0
rain_color		=	1.0,	1.0,	1.0
thunderbolt		=
bolt_period		=	3.f
bolt_duration	=	0.25f
wind_velocity	=	0.0
wind_direction	=	0.0
ambient			=	0.0425,	0.045,	0.0475
lmap_color		=	1.0,    1.0,  	1.0
hemi_color		=   0.500, 0.525, 0.550, 1.0
sun_color		=	0.829, 0.508, 0.406
sun_dir			=	-45.0, 291
env_ambient		=	ambient_env_evening

[hospital_01_ok]
flares			=  	flares_sun_rise
sky_texture		=	sky\sky_2_cube
sky_rotation	=	0
sky_color		=	1.0,    1.0,  	1.0
clouds_texture	=	sky\sky_oblaka
clouds_color	=	0.698, 0.447, 0.322, 0.5, 1.7
far_plane		=	350
fog_distance	=	350
fog_color		=	0.322, 0.302, 0.353
fog_density		=	0.9
rain_density	=	0.0
rain_color		=	1.0,	1.0,	1.0
thunderbolt		=
bolt_period		=	3.f
bolt_duration	=	0.25f
wind_velocity	=	0.0
wind_direction	=	0.0
ambient			=	0.080, 0.0825, 0.0850
lmap_color		=	1.0,    1.0,  	1.0
hemi_color		=   0.80, 0.825, 0.850, 1
sun_color		=	0.818, 0.476, 0.108
sun_dir			=	-14.0, 291
env_ambient		=	ambient_env_morning


[sect_hospital_indoor]
00:00:00	   		=	hospital_indoor_01
12:00:00	   		=	hospital_indoor_01

[hospital_indoor_01]
flares			=
sky_texture		=	sky\sky_yantar_cube
sky_rotation	=	0
sky_color		=	1.0,	1.0,	1.0
clouds_texture	=	sky\sky_oblaka
clouds_color	=	0.7, 0.7, 0.7, 1.0, 2.0
far_plane		=	450
fog_distance	=	240
fog_color		=	0.227, 0.227, 0.215
fog_density		=	0.9
rain_density	=	0.0
rain_color		=	1.0,	1.0,	1.0
thunderbolt		=
bolt_period		=	3.f
bolt_duration	=	0.25f
wind_velocity	=	0.0
wind_direction	=	0.0
ambient			=	0.00225,   0.00250,  	0.00275
lmap_color		=	1.0,	1.0,	1.0
hemi_color		=	0.7,   0.725,  	0.75,	1.0
sun_color		=	0.0,    0.0,  	0.0
sun_dir			=	-25.0, 291
env_ambient		=	ambient_env_indoor